pifconfig(8)
============

NAME
----
pifconfig - display information about a network interface


SYNOPSIS
--------
pifconfig [INTERFACE]


DESCRIPTION
-----------

This script mimic ifconfig behavior, but is written purely in python
and python module ethtool.


OPTIONS
-------

INTERFACE::
Display information about only this interface. If no interface is given
then all interfaces are displayed.

-h, --help::
Show help message and exit.


SEE ALSO
--------
ifconfig(8)



AUTHORS
-------
Arnaldo Carvalho de Melo <acme@redhat.com>

Man page written by Miroslav Suchý <msuchy@redhat.com>
